KaI600-2350_9
author: Glaser, Johann Friedrich

L

P ul

"^

v

a

E

*

";

E

g

á

&

*

*

p N

s

L

*

T

Bs

E

d

m

;8

"

us s a

h-

- d

Pl

L.

has

aw

»

*

-

&

*

a

E

p

M

g

wem

" d

T

perti-

L.

*

"

»».

E

Lodi:.:

*

*

mw?

d

r i

*

*

E d

sy. 9X

u

J&

af

»

"

£

-

$

z

*

O

L nl

b

L d

« u

,.

E

*y

P

P

A.

*s

3

M

3

ts

Ed

JW

M

:

.

*

C

g

[j

m

A" od

3

"

LR

4

E

Á

*s

$?

»fkïü

d *

P d

^.

€—

*

a

".

m

E

mhh

*

" i

É

p

,

"

*

H

€

s

»W

&ww aw

Ls a

3

*

*

s

dÉ

P

E

J

F

a

P d

b

À

d. À

j P

d

"W

*

H

r

d&

*

d

o É

*

d.

£

*

«

LA

*

d

d2

T d

E

-

wiik

s

h a

«Ww.y

&Wä

g

EF

p

- d

E

»

í

al wmw

sE v

W

$od

ii 0

: -

*

k:

n

JM

p

d

Ws

Ls z

m

"

m

Là-

À

f

L

-a

*s

- i

P

3.

Wa

*

i As

A

ä.w

w

-

d

*

b

*

:

d

&

&

325

r

X

P

$s

üä t»ï d

ao

M&s

-

d

e

h

v dbseq ii

"

nb

á

*

s

d n

g

w

&L.L

3 .

[ À

w "

-

ipe

P

"-

**

.»a& * &ummsmwAW Á»

m a

*

J

*

WW

P

$

r d

»?

J

L:

h

E a

Lab lo

d

J

Mm

,

E d

f

L as

j

E

^

E

" s

i

".

& r

v

P d

ye

M

g

*

"

.

h

y*

W

L

i

-^

a

l

F

1.

»

db

r d

-

b

j

)

M

3 i

*

*l

:

-

*

X

n

od

7

4

A

«.xäuüw

»

" w

NU E

m

WW

W

od

d.

P.

&

—

w

t

$*» k

"

Mw

,

:

,*

$

x

LA

*

a

ä»ï

*

39

r

»s

g

^

F

& W

"n Rl j

F

4

gt

1

m

E

^"

n

-*

£

^

E

n d

Mi

,

M

E

AE

-

".

r d

"h. iX

W

f

E

;

*

:L1

"

E d

"

JW

E

- if

;

o

box .

-

E.

MM

Va

LO

h

w

"

x

*

""

kwï

* 4

:

R3

ää& ?N

v

A

E

La

*

al

d

E

" l.d

:

d

^dis.

"s.

&

"

-

T u

,

*

h

"

»w»;

F

w

k w

E

j

ts

z

5

LO

n

"

sä*;

, À

L

P n

É

ts

M éewso

N u-

"

»

»

3-

u *

g

m

*

vesib

s a

d

-

F.

9

s

"R mmw

^

agl

]

E

3

t

Ed

k

yc

--

^

"P — i

7

P /æMw wwï

" m OR

agf

M

d.

Ó

y

*

ab

E

L]

* d

s*

&

T

P.

P.

b

L od

»

E

T

-

«"

.*Q»«K»æi

H

WJH

MMWW

d'n

a

&^

43

" i

gt

[

P d

f*

"

-

H

" * .

p*

i

Ms .2

f

"

]

st

3

--

.af

*

* .hu

w.ws

:

.*

.

Ll

^

t

N

E

AOT ie

]

.

p

æ,wu.m "

, N

M.»uïv

n

P d

-

"

*

P

:ü.ä

*

Af

AWH

T

^

u d

:

d.

V o

n

$

Y*

LM

t

i

"d

R

M

». .

F d

Á

dÉ

&W...»

h.

*

&

H

i

MT L

E

X d

$

at

2

b

*

A o

J

dile

é uæufv k

m d

Ép üxülï

?r»wvh?»

T.

-

ao

"

5

; OP

F

a

p u n

*

v

3

u us

d

»

£f

*

—«

Www

i

É

E

-

ciio-

—

Em

-

PL

—

TE

—

— —

s

-

Ts

*

SESSBISISIICINHELE NSe R MSSR rR

d

*

E

"

*

i

j

E

d

&

o

A.

ag "

Voy

odl

-

A

E

|

*

Es

»

^

.

N

d

EE

;

.

L^ ed

M

—

u

4

n

*

r

Mb

.

*sf

u

E

W

nW

—

—— —

——

—

E

ORDINIS MEDICORVM IENENSIS

H

T

DECANVS

D. ERNESTVS AN 'EONH/S

. NICOLAI

SOLEMNIA INAVGVRALIA

CLARISSIMI MEDICINAE CANDIDATI

IOANNIS FRIDERICI GLASER

HILPERHVSANI

f&.D. x IVLII clonccLxxxvitt,

HABENDA

IN D

DC I GE

Praemittitur. commentationis

de fanguimis miffione im febribus intermittentibur

particula fecunda

IENA

LITTERIS GOPFERDTIANIS.

8

ACN

2]

2

3.

»-

£a

ü*'*xi

*

A

fk./,,.«

*

xee

|

N

ng/?

j

-

Z

J

u

«

T

R

——

SS

a

E

wq

— Z

X ,

2

* 2

Cs

I ä

t

[

— NI

MUAT

7

d

OREsTVsipfe, vide eius Ofórvat. Lib. V. 0Ozf 2.

tertiana afflictus poft eius paroxysmum tertium

adeo vehementem, vt in ftatu eius. deliraret, tem-

pore apyrexiae fibi ex vena bafilica dextri brachii

vncias quatuor fánguinis extrahi curavit, fed inde

adeo debilitabatur, vt fyncopen fibiinftare praefen-

tiret, quam vero inhibito fanguinis fluxu et modi-

co fumto vino depulit. Quae alteratio adeo profuit,

vt febris eum dimitteret,

AMATVs Curat. Medicin.

Cent, Vll. curat $:,. vnica venacfectione foeminam

duplici tertiana perfecte liberauit et PEcuLINvs

Qbjervat. phyfico - med, Lib. Il. o2f; XIl. meminit famu-

miae

lae ruíticae, quae Ham;cxigtomia loco phleboto

per

—m&v*ä ':Vä...p.ä'*

Ti m

-

J Es5 —

3

per errorem facta a tertiana xïhce conualuit. Cla-

rifimusMApari Tract. Ze femz!m intertnittentibus $. 203

mentionem facit

mulieris lactationis

ïf:mporc

tertiana laborantis.

Varia incaíffum adhibita fuü-

crunt remedia,

donec

41 Inemoriam revoca-

ret, ipfam ter anteaiam matrem bene íe habuiffe;

quod mox poft puerperium catamenia erumperent.

Subftituit itaque , quum et acceffionis tempore dor-

fi dolores experiebatur, partus doloribus vehemen-

tiores, venaefectionem, qua inftituta filuit febris.

Reuerfam poft quatuor hebdomades denuo phle-

botomia profligauit. Tertio redeuntem denuo fan-

guinis miffione fugavit

'Tandem erumpentibus ca-

tameniis febris omnino evanuit

Illuftris HAR T-

MANN, vide eius Differtationem de /azguinis :miffonis

ip febribus intevmittentibus vtilitate, Vraiecti ad Viadrum

1777. $. XVL, duas habuit obferuationes, quae huc

fpectant, Nimirumiuuenis, XIV annos natus, ple-

thoricus correptus erat tertiana.

Suafit vir illuftris

phlebotomiam, fed noluit eadem vti ille, atque

alia remedia .ad debellandam febrim in vfüm vo-

cavit, his autem nil iuvantibus rediit.

Denuo fua-

fit laudatus vir fanguinis miffionem, quam demum

inftituit aeger , eo euentu, vt a febre poftea, abí-

que omnialio medicamento, fanitatem recuperaret,

Al.tcra hiftoria ad mulierem XXX annorum attinet,

A

ytpote

o

d

C

4

W w

as —

vtpote quae plethorica. tertianaque Iaborana Cata«

menia diu non.habuerat

commendauit illuftris

Hartmann, quum ad eum accedebat, vt antifebri-

lia fuaderet, phlebotomiam, quam etiam inftituen-

dam curault, tanto cum fructu, vt febris abiret at-

que catamenia demum crumperent,

L&owN. Bo-

TALLVS de cauratioze per fauguiuis snifftonem cap.XV. p. 209,

Jéqu

et cap. XVI. Varios notatu dignos retulit cafus

quibus quartanam tam 1Dueteratam quam recens na-

tam repetita fanguinis miffione felici fucceffu pro:

fligauit

Celeberrimus CLEGHORN vor den Krankhei-

ten im Minovee cap.llY. p. 186, in omni tertiana,fi mox

vocatus erat, fanguinem mifit atqueaetaten

ant-

nonegligens X ad XII vncias fanguinis détraxit, at-

que fi cephalaea aut grave delirium et magnus dolor

aut áeftusin interioribusobferuabatur, repetiit fàn-

suinis miffionem, tumque, docet, paroxyfmorum

vehementiam imminui, apyrexias perfectiores red-

di; emetica et purgantia meliusagere acfymptoma-

tapericulofa arceri, vt difficilem refpirationem, fo-

porem cum delirio atqueinflammationer vifcerum.

Haec praefari ex confuetudine hbult OccafïOne

folcmms Actusin honoxem

PRAE-

A EM

v

(

:

P

iesenes

p

w

&

f

1

?:þ

"

r

LREZ

Mi

$

PRAENOBILISSIMI ATQVE DOCTISSIMI MEDICINAE

CANDI DATVI

IOANNIS FRIDERICI GLASER -

qui, quibus parentibus natus quibusque praeclaris

artibusac ftudiis hactenus laudabili ardore penitus

imbutus fuerit, nunc ipfe enarrabit:

idericus Glafer mmy Hif

^

4X

Eg*() lounnes F

/

Poer

fuifae auno M DCCL XHI Patrem veneror I[a-

cobum. Henricum Glafer smocuratorem iuea-

denm wrbe aulicum, matrem vero ex flirpeBeche-

riana neatausfed iamiuter coelitestriumphan-

ten.

Qui dilectilfimi parentes omnem adhi-

buerunt operams, vt primis religionis Chri-

füiamae qraeceptis. omnibusque dis difcipfinis,

quibus puerilis aetas informari fofet , iuflru-

erer.

Quo facto fcholam. n patria. vrbe flo-

rentem. frequentare coepà ibique praeceptores

opvtime de qme serità fiterus ad bumanitatem

24 tinentes 4ne 6[06"22??/'257&25, ex [;ïZ?äMS prae cae-

teris clariffmus onEssEL fcholae qutriae Re-

&or. meritiffimus. omnique pietate, hi. fem-

qer colendus fummuis mihài extollendus eft. [au-

dibus. Praeteriaypfis aunis f[chofaflicis a deci-

ao quito qege aetatis a

Fa

um diore qha

a

ciae

QS,,&J

t

-

dX .fE

P

eiae adifcendae captus Smalcaldam qme con-

1uli , vbi duce l'ogelio pharmacopeo dexterri-

ao primda huius artis elementa hawf atoue ex-

TK

s

I

"n

colui. . /dnno M DC

V .

LXXXIV N

U

AUb S

A FE

(

F (y7

(

,

finito pharmacevtices tirocinio Cobui

e^

m ro-

LCGU LUI

/7201!£Ól)h*

e cont]ti-

f:

fectus fcientiae medicae operam m

tueram., fed.hoc propoj

fito n

ihi fuset 0!6»*7?/?:8;2—

dim, mifi liberalitate et. benignitate. optimi

Cognati Perilluflris uevscugEL. Confiliarii

jntimi Coburgenfis fuilJem adiutus, cui foli de-

$eo, quod, curfum. 1uewm academicum TIenae

jnire profequi et abfoluere potierim , dd. quod

qon po[[Jum. mon qublice gratiffima qrofiterà

anente.. A l'ivo[umme Reverendo poEDERLEIN

tunctemporis Prorectore àn mumerum ciuium

academicorum. fum veceptus. In qhüfofophücis

feientüs, omniwn veliquarun fundamentis,om-

g qrimum. et praecipuium ducem. TMlufirem

vpncH efeoi emmque fogicam et metaphuficam,

anthropologiam qhütofophücam, ius maturae

aphiülofophiam. smoralem et. hüfloriam . phüofo-

qhüae exponentem fumma . cwmn vtilitate et vo-

duptate audivi, Phuficam, mathefin, hiflo-

viam naturalem et chemiam phuficam me illa-

flris svccov. docuit. His doürimis probe in-

firu&ius ad. comparandum ipfius. enedicinae

C0g-

E

w

"H

cognitionem me contufi et ilufiri N1 cov x facut-

tatis gratiofae medicae feniore et hoc temgore

Decano fpetiatiffanoinpathologia ac feimiologia

iam generali quam fypecialà et illufiri GavwER

qatrono ac fautore maximopere qihi colendo

intherayia generali et fpeciali,medicina foren-

f^. Calft explicatione mec mon in. exercitatio-

mibus difputatoriis fumma vofuptate et utili-

gate ufus fuun graeceptoribus. Auatome,chirur-

giamedica et anamtali itemque arte obfletricia

jlufiris atque excellentiflumis xopER ger-

diligenter ine inforuxit ejusque aufpiciis qra-

xin obfletriciam n nofocomio obfletricio exer-

Cci.

Mhufirem. excellentilfumum. atque expe-

vientà g'z'mzzm STABRKE, Uirim qmihi aeterumm

colendum, cui fic publice pro fua . in me bene-

volentia et amore eratias, quas qo[um, ana-

ximas ago, m qhufiologia, materia aedica,

et arte obfletricia praectariffamn habui qraece-

ptorem eoque

G

/7

i

we aegrotos vifitaui et- curaui,

Denique. praeteclionibus im rem herbariam

excellentilfimi wavschet offeolopicis experien-

tlluni D. Ik SCHENCKE mæïfmþ

His fultus fübfidiis ad. nos acceffit et acï examina

admifTus egregienobis fuam eruditionem probauit et

di-

j«

RE À

n i d-

2 J5

bYe-]

9

w

-£G

dignus iudicatus eft, cui fummi in medicina hono-

fes conferrentur.

Quod vtrite fiat, proximo die x

[ ]

Iulii fuam differtationem inauguralem de Incontinen-

tia alvi fine praefide publice defendet, Quare wAq-

NIFICVM ACADEMIAE PRORECTÓREM, MAGNIFI-

CVM ACADEMIAE PRORECTOREM ,DESIGNATVM,

PATRESACADEMIAE CONSCRIPTOS AC PROFESSO-

RESCELEBERRIMOS, PROCERES VTRIVSQVE REI-

PVBLICAE GRAVISSIMOS, GENEROSISSIMOS AC

NOBILISSIMOS COMMILITONES, HOSPITES OM-

H

(

RIVM ORDINVM LITERARVMQVE ET BONARVM

P

ARTIVM FAVTORES HONORATISSIMOS Ordinis

SE

mei verbis omni obferuantia oro rogoque, vt prae--

C0

fentia fua hanc panegyrin folemniorem et illuftrio-

TT

P4]

rem reddere velint. P. P. fub Sigillo Facultatis a. d.

M

vL Iulii cioroccrxxxvimr.

"

Z E

u

^s

E

pra

NY

Ne

"

a.

2

d

,

N

Á

NSwes

&

a

yy

G

-

MGicEAS

—

—

E

£

x Ls

)

-

72

Ts

N

m

U a

"

t

fs

P

st

m

EN

u

o E

N

^s

d

L.

E

dv

al

d

23

d

- s

EC

TMUE

x

ais

r

a

W,

ie

y

)7

j*

A

"d

U.

o

"

L-

"

lFs

s

1.

*

$

L

[:d

M

.H

r

n

Ls

K

*s

5v

3

a*

t

r

L.

,

di

Ls

|atÀ.

N

n

as

—

ERE

ml

-

E EE

—

EEE a eIIET

TOR

—

--

—

TOU U ÉNN-

w F

Bw OX

«l

æmvæa

*s

m

p*

H.

g*

n

EU

rl

r

t

lat

s

f

"w R

LA

P

arts

A

Qï

bt

b

j

al

K

Y*

&

L M

PA !w*,

UM

s

*

ii

7

z

Wæi,

T

;

» À

".

tm,.. æ?*e»

. *

:

iM

A

AT

m

Ld 1&)

av

w&.

G.Mv,

*&v

UX

à AWUX

SK

Jf&æ

w

*wäw

TX

F

aj

w . w

L

P

Bd

b

domRe

i

T

Hs o

p $

^

æ&ww

JM

"Y

æf

*s d

& À

m aE

W

i

N

y x*

a m

M

&

»

T: r.lvk)* &ä

U

P

od

QU

4

.;1

* u

m s ?W

; a

*

g *ä m:.

7-

V lod

"1

.Xuæ

»

-

n

*

L.

x

hd

Wäl

m

T.

A

«

d

(

x..wW

-

*

W

o a*

s

j

p

^

w.ï

E

M

» w

"d

w

"3 ï.r

A

d

£t À

m ufi

. j

w F ..

p

L.

4

««

£,*

l.:äüs

Ww

s.

£

*

A

&wïe ^

v

—

&

y

ydic

d

N

Ls

A us

» d

W

W.W

-

É

L

7—/;1

y

L

j**

*

z

&äæ»,

o

n A

La

æ.ün

"p

* æï QJ.MW

TL

:

o

:

Á

äüw

.

m "*

;

* .

l ?W&

&Mag

*

J *

: us

I ds

-

G ofv

» d

*. N

^

i

As

k d

7

k

"

w

* i

M?

d

&V

mw

hd

Á

PT

E

P.

Fa

*

-

&

as n

-T us

*

4

W

»Á

»

"

,

E

".

-2

*

W

s

*

LE

d

ub d

* d

w X

.

-

a

-s

&ïm j

»

]

st

-

:

d

d d

74

z

s

" d

[j

w.»b»kö.«

-

"-

a

"

p

- d

x

M^

gc4 r

C

P.

$-;

xw/A

at

P

E

L:

P

"

*

ï-ï

n

E od

E

s

*v

*

d

WMW d

2

$,

Em

s

ES

*

* i

,M;.N

E

* f»ä&«u—

]

aM g

La^

"d

*

*

"w

E

-

-

"

FE

A

s m

p*

"

ub u

*

*

Nm!

wL

M.

Md

p

g u

-

- d

u€

E

Fa

T ld

pR

1

*

Lí

"

n

ww

*

Pt

At o

Wx

P

af

! n

E R 3

L

x&ü

.«Ws

MW»H

PC

[

*«

" d

L

a(

k

9-

i df

u

*

—

s

8

Y

*

od

X

2 W.

sz&a

*

N 7-

ä

T m

W

, -

MM.

W g

*

rd

P

p g

n

jecaant

**

T d

wf

WM&WB:

L

F

^

À

» Y

ü&fæ

t

: d

.

,J

*

qees

LY

p

Y ^5

n

"

J

Lj

1

*

E

r

sd

ääfw

M

w

d

E

p

d a

* .

hia

äwï..aa&.s

*

E

J

.æ.-.ä æa

ü;&.

;»wïk

t

*

*M.u.

Ó

A

H

m

f

-

Ra

gesoquequr

Ri

1

f

wm&&

"-

a

"

J

,Wm. .-x&ï

"

E

-

E

$

F

o agr

p

K

.»w«mff

M

*v

ä».

" d

1

d

m

Ls -

4

E acdi

ge

Lj

Ts

y^*

;

*

W

RP d

,dem

"

1

a

Vg

Ys.

j

:

$

J

a

LN

: i

ais

á

aaw

E Z

L d

ts

xww

as

$i

9

?

EM

M

W.x

$ »*

$d.

m

[j

T

z .

r dl

H

.,M

"

z

*

» d

ET

1

,

d

3

g

AE aE

w*

s

E

f

L

sf

-

Á

1äw

.*

"

"À

*

ld

Mp

PO

E

3-

..,w

"

Mn

r

kb

3

?

*

"s

nm«

1

L

Á

.&w&ä

*

*

*

*

w

E

W»/

-

x

Y

w

?

-

m

L.

»

*

4

"-

Ed

j

Lj

Lj

i

pue

5

"*

EU

iod

a

Ae

r d

É

*

i i

b

L

54

L

,2

"

F*

r

m

p

A

*

&

á mw än

Jee

r

»»

d

-

d

4

"

ES

E

àÓ *

d

k d

F

Q

-

M

p

f

; x

UPs

Y

;

*

P*

1

*

Wv

*

á

M.

*

Ws

E

T d

t

g

P

p

-

ATRT

P

Mæ

wy

*

&

Ed

"U

p

E

a

p

B-

xwmv

L3

t

"

u

m

"M

il

*

3

*

*

k

Hanw

k u

u lE.

&

ORDJNIS:MspzconwAïIENsNSIS

H

4

19

18

,pECANVS

VierFarbSelector Standard * - Euroskala Offset

17

D. ERNESTVS ANTO

NIVS

g

16

ENN

l

. NICOLAI

Uä.,

SOLEMNIA INAVGVRALIA

ä

CLABRISSIMI MEDICINAE CANDIDATI

«

a

IOANNIS FRIDERICI G.LA.SER:

*

HILPERHVSAB?"I

23

A. D. x IVLII cIonQCLxxxvxxr.

e9

HABENDA

1 NODIG); T

-

Bo

6

Praemittitur comnäentatïon.ïs

de fanguinis millione im febribus immniz*tezm'þw

5

h particul:f fecunda.

4

3

IE'NA

2

LITTERIS GöþFERbTIANIS;

1

'ä/ Copyright 4/1999 YxyMaster GmbH www.yxymaster.com